--- chewbacca/YodaProfiler/docs/PAMELAProductionDB.sql	2008/11/07 08:56:08	1.7
+++ chewbacca/YodaProfiler/docs/PAMELAProductionDB.sql	2008/11/28 09:10:13	1.8
@@ -246,6 +246,7 @@
 insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","tofcalib_28.rz",1196280001,1206100000,201," 11-29 - 03-21                          28      28      standard",NULL);
 insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","tofcalib_29.rz",1206100001,4294967295,201," > 03-21         HV_C problems          29      29      standard",NULL);
 insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","ToFCalibParam.txt",1,4294967295,202," GP ToF parameters ",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","adcmonitor.7th.100k.cut.dat",1,4294967295,203," ToF dE/dx II order correction parameters ",NULL);
 insert into GL_PARAM values(0,"$PAM_CALIB/orb-param/","igrf05.dat",0,0,301,"igrf 2005",NULL);
 insert into GL_PARAM values(0,"$PAM_CALIB/orb-param/","igrf05s.dat",0,0,302,"igrf 2010",NULL);
 
