--- chewbacca/YodaProfiler/docs/PAMELAProductionDB.sql	2014/10/24 12:30:15	1.65
+++ chewbacca/YodaProfiler/docs/PAMELAProductionDB.sql	2014/10/24 14:05:55	1.66
@@ -2806,7 +2806,7 @@
 insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","calibfile_tofdedx_x10thred.txt",1,1,203," ToF dE/dx II order correction parameters - Rita",NULL);
 insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","biscale_tofdedx_x10thred.txt",1,1364790400,203," ToF dE/dx II order correction parameters - Rita",NULL);
 -- EM param
-insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","biscale_tofdedx_x10thred_corrected2014",1364790400,4294967295,203," ToF dE/dx II order correction parameters - EM",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","biscale_tofdedx_x10thred_corrected2014.txt",1364790400,4294967295,203," ToF dE/dx II order correction parameters - EM",NULL);
 --
 insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","atten_period_1.dat",1,1150848001,204," ToF attenuation parameter file period 1 ",NULL);
 insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","atten_period_2.dat",1150848000,1154995201,204," ToF attenuation parameter file period 2 ",NULL);
