--- chewbacca/YodaProfiler/docs/PAMELAProductionDB.sql	2014/10/23 09:06:58	1.61
+++ chewbacca/YodaProfiler/docs/PAMELAProductionDB.sql	2014/10/23 09:19:55	1.62
@@ -2624,7 +2624,13 @@
 insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","tofcalib_61.rz",1325372401,1335823200,201," 12-01-01 12-04-30         good",NULL);
 insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","tofcalib_62.rz",1335823201,1346450400,201," 12-05-01 12-08-31         good",NULL);
 insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","tofcalib_63.rz",1346450401,1356994800,201," 12-08-31 12-12-31         good",NULL);
-insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","tofcalib_64.rz",1356994801,4294967295,201," >13-01-01                 good",NULL);
+--insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","tofcalib_64.rz",1356994801,4294967295,201," >13-01-01                 good",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","tofcalib_64.rz",1356994801,1372629600,201," 13-01-01 13-06-30         good",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","tofcalib_65.rz",1372629601,1384700000,201," 13-06-30 13-11-17         good",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","tofcalib_66.rz",1384700001,1387400000,201," 13-11-17 13-12-08 HV_H problems",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","tofcalib_67.rz",1387400001,1388530800,201," 13-12-08 13-12-31         good",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","tofcalib_68.rz",1388530801,1372629600,201," 13-12-31 14-06-30         good",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","tofcalib_69.rz",1372629601,4294967295,201," >14-06-30                 good",NULL);
 insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","ToFCalibParam.txt",1,4294967295,202," GP ToF parameters ",NULL);
 insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","adcmonitor.100k.cut.dat",1,1,203," ToF dE/dx II order correction parameters ",NULL);
 insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","dedxmonitor.C.5d.8th.all.dat",1,1,203," ToF dE/dx II order correction parameters ",NULL);
