--- chewbacca/YodaProfiler/docs/PAMELAProductionDB.sql	2014/10/23 09:01:31	1.60
+++ chewbacca/YodaProfiler/docs/PAMELAProductionDB.sql	2014/10/23 09:06:58	1.61
@@ -2700,6 +2700,8 @@
 insert into GL_PARAM values(0,"","",1309910401,1310083200,217," H connector ",NULL);
 insert into GL_PARAM values(0,"","",1168940001,1169580000,220," M connector ",NULL);
 insert into GL_PARAM values(0,"","",1155850001,1156280000,221," N connector ",NULL);
+-- WM new:
+insert into GL_PARAM values(0,"","",1384700001,1387400000,217," H connector ",NULL);
 insert into GL_PARAM values(0,"$PAM_CALIB/orb-param/","igrf00.dat",1,1104537600,301,"igrf 2000",NULL);
 insert into GL_PARAM values(0,"$PAM_CALIB/orb-param/","igrf05.dat",1104537601,1264400000,301,"igrf 2005",NULL);
 insert into GL_PARAM values(0,"$PAM_CALIB/orb-param/","igrf10.dat",1264400001,4294967295,301,"igrf 2010",NULL);
