--- chewbacca/YodaProfiler/docs/PAMELAProductionDB.sql	2014/09/02 13:38:20	1.57
+++ chewbacca/YodaProfiler/docs/PAMELAProductionDB.sql	2014/09/05 12:22:58	1.58
@@ -2506,8 +2506,8 @@
 insert into GL_PARAM values(0,"$PAM_CALIB/trk-param/","mask_param-ID744MM/",1396396800,1396483200,6,"trk mask",NULL);
 insert into GL_PARAM values(0,"$PAM_CALIB/trk-param/","mask_param-ID744MM/",1396483200,1396569600,6,"trk mask",NULL);
 insert into GL_PARAM values(0,"$PAM_CALIB/trk-param/","mask_param-ID744MM/",1396569600,1396656000,6,"trk mask",NULL);
--- mask_param-1 == no masking 
-insert into GL_PARAM values(0,"$PAM_CALIB/trk-param/","mask_param-1/",      1396656000,4294967295,6,"trk mask",NULL);
+-- mask_param-1 == no masking // UPDATE: use conservative mask calculated by Emiliano looking at quicklook plots.
+insert into GL_PARAM values(0,"$PAM_CALIB/trk-param/","mask_param-ID0E/",   1396656000,4294967295,6,"trk mask",NULL);
 
 
 insert into GL_PARAM values(0,"$PAM_CALIB/trk-param/","default_calib/",0,0,7,"default calibration",NULL);
