--- chewbacca/YodaProfiler/docs/PAMELAProductionDB.sql	2014/07/07 09:44:42	1.52
+++ chewbacca/YodaProfiler/docs/PAMELAProductionDB.sql	2014/07/29 10:43:13	1.53
@@ -2238,7 +2238,10 @@
 insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","dedxmonitor.C.5d.8th.all.dat",1,1,203," ToF dE/dx II order correction parameters ",NULL);
 insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","dedxmonitor.He.8th.all.dat",1,1,203," ToF dE/dx II order correction parameters based on He",NULL);
 insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","dedxmonitor.He.9th.all.dat",1,1,203," ToF dE/dx II order correction parameters based on He 9th data reduction",NULL);
-insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","calibfile_tofdedx_x10thred.txt",1,4294967295,203," ToF dE/dx II order correction parameters - Rita",NULL);
+-- Rita param (calib_tofdedx quello giusto!)
+insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","calibfile_tofdedx_x10thred.txt",1,1,203," ToF dE/dx II order correction parameters - Rita",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","biscale_tofdedx_x10thred.txt",1,4294967295,203," ToF dE/dx II order correction parameters - Rita",NULL);
+--
 insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","atten_period_1.dat",1,1150848001,204," ToF attenuation parameter file period 1 ",NULL);
 insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","atten_period_2.dat",1150848000,1154995201,204," ToF attenuation parameter file period 2 ",NULL);
 insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","atten_period_3.dat",1154995200,1158019201,204," ToF attenuation parameter file period 3 ",NULL);
@@ -2260,7 +2263,18 @@
 insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","atten_period_19.dat",1228953600,1237593601,204," ToF attenuation parameter file period 19 ",NULL);
 insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","atten_period_20.dat",1237593600,1244592001,204," ToF attenuation parameter file period 20 ",NULL);
 insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","atten_period_21.dat",1244592000,1252108801,204," ToF attenuation parameter file period 21 ",NULL);
-insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","atten_period_22.dat",1252108800,4294967295,204," ToF attenuation parameter file period 22 ",NULL);
+-- Rita param:
+--insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","atten_period_22.dat",1252108800,4294967295,204," ToF attenuation parameter file period 22 ",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","atten_period_21r.dat",1252108800,1260230401,204," ToF attenuation parameter file period 21 Rita ",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","atten_period_22r.dat",1260230400,1268352001,204," ToF attenuation parameter file period 22 Rita ",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","atten_period_23r.dat",1268352000,1291161601,204," ToF attenuation parameter file period 23 Rita ",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","atten_period_24r.dat",1291161600,1300233601,204," ToF attenuation parameter file period 24 Rita ",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","atten_period_25r.dat",1300233600,1309737601,204," ToF attenuation parameter file period 25 Rita ",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","atten_period_26r.dat",1309737600,1324771201,204," ToF attenuation parameter file period 26 Rita ",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","atten_period_27r.dat",1324771200,1337731201,204," ToF attenuation parameter file period 27 Rita ",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","atten_period_28r.dat",1337731200,1350691201,204," ToF attenuation parameter file period 28 Rita ",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","atten_period_29r.dat",1350691200,4294967295,204," ToF attenuation parameter file period 29 Rita ",NULL);
+--
 insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","attenuation.txt",1,1,204," ToF attenuation parameter file ",NULL);
 insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","desaturation_position.txt",1,4294967295,205," ToF desaturation on position parameter file ",NULL);
 insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","BetheBloch.txt",1,4294967295,206," ToF BetheBloch parameter file ",NULL);
@@ -2273,6 +2287,8 @@
 insert into GL_PARAM values(0,"","",1168490001,1168940000,213," D connector ",NULL);
 insert into GL_PARAM values(0,"","",1185090001,1185212000,213," D connector ",NULL);
 insert into GL_PARAM values(0,"","",1191100001,1191940000,213," D connector ",NULL);
+-- Rita new:
+insert into GL_PARAM values(0,"","",1320710401,1322006400,213," D connector ",NULL);
 insert into GL_PARAM values(0,"","",1176800001,1178330000,214," E connector ",NULL);
 insert into GL_PARAM values(0,"","",1217989201,1218547800,214," E connector ",NULL);
 insert into GL_PARAM values(0,"","",1225789201,1226566800,214," E connector ",NULL);
@@ -2284,6 +2300,8 @@
 insert into GL_PARAM values(0,"","",1178330001,1181322000,217," H connector ",NULL);
 insert into GL_PARAM values(0,"","",1184000001,1184570000,217," H connector ",NULL);
 insert into GL_PARAM values(0,"","",1196230001,1196280000,217," H connector ",NULL);
+-- Rita new:
+insert into GL_PARAM values(0,"","",1309910401,1310083200,217," H connector ",NULL);
 insert into GL_PARAM values(0,"","",1168940001,1169580000,220," M connector ",NULL);
 insert into GL_PARAM values(0,"","",1155850001,1156280000,221," N connector ",NULL);
 insert into GL_PARAM values(0,"$PAM_CALIB/orb-param/","igrf00.dat",1,1104537600,301,"igrf 2000",NULL);
