--- chewbacca/YodaProfiler/docs/PAMELAProductionDB.sql	2014/02/21 14:32:50	1.47
+++ chewbacca/YodaProfiler/docs/PAMELAProductionDB.sql	2014/02/24 14:07:10	1.48
@@ -708,7 +708,18 @@
 insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","tofcalib_50.rz",1254355201,1257033600,201," 09-10-01 09-10-31         good",NULL);
 insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","tofcalib_51.rz",1257033601,1259625600,201," 09-11-01 09-11-30         good",NULL);
 insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","tofcalib_52.rz",1259625601,1262304000,201," 09-12-01 09-12-31         good",NULL);
-insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","tofcalib_53.rz",1262304001,4294967295,201," >10-01-01        good",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","tofcalib_53.rz",1262304001,1264464000,201," 10-01-01 10-01-26         good",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","tofcalib_54.rz",1264464001,1277935200,201," 10-01-26 10-06-30         good",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","tofcalib_55.rz",1277935201,1293836400,201," 10-06-30 10-12-31         good",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","tofcalib_56.rz",1293836401,1304200800,201," 11-01-01 11-04-30         good",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","tofcalib_57.rz",1304200801,1314828000,201," 11-05-01 11-08-31         good",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","tofcalib_58.rz",1314828001,1320700000,201," 11-09-01 11-11-07         good",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","tofcalib_59.rz",1320700001,1322020000,201," 11-11-07 11-11-23 HV_D problems",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","tofcalib_60.rz",1322020001,1325372400,201," 11-11-23 11-12-31         good",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","tofcalib_61.rz",1325372401,1335823200,201," 12-01-01 12-04-30         good",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","tofcalib_62.rz",1335823201,1346450400,201," 12-05-01 12-08-31         good",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","tofcalib_63.rz",1346450401,1356994800,201," 12-08-31 12-12-31         good",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","tofcalib_64.rz",1356994801,4294967295,201," >13-01-01                 good",NULL);
 insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","ToFCalibParam.txt",1,4294967295,202," GP ToF parameters ",NULL);
 insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","adcmonitor.100k.cut.dat",1,1,203," ToF dE/dx II order correction parameters ",NULL);
 insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","dedxmonitor.C.5d.8th.all.dat",1,1,203," ToF dE/dx II order correction parameters ",NULL);
