--- chewbacca/YodaProfiler/docs/PAMELAProductionDB.sql	2013/11/05 11:27:28	1.46
+++ chewbacca/YodaProfiler/docs/PAMELAProductionDB.sql	2014/02/24 14:07:10	1.48
@@ -634,23 +634,28 @@
 insert into GL_PARAM values(0,"$PAM_CALIB/cal-param/","FCaloADC2MIPfc.dat",2,4294967295,101,"Calorimeter ADC to MIP from flight, relativistic particles",NULL);
 insert into GL_PARAM values(0,"$PAM_CALIB/cal-param/","calo_adc2mip_special0.dat",1,1172976488,110,"Calorimeter ADC to MIP from flight, special cases",NULL);
 insert into GL_PARAM values(0,"$PAM_CALIB/cal-param/","calo_adc2mip_special1.dat",1172976488,1190000000,110,"Calorimeter ADC to MIP from flight, special cases",NULL);
-insert into GL_PARAM values(0,"$PAM_CALIB/cal-param/","calo_adc2mip_special2.dat",1190000000,4294967295,110,"Calorimeter ADC to MIP from flight, special cases",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/cal-param/","calo_adc2mip_special2.dat",1190000000,1345420800,110,"Calorimeter ADC to MIP from flight, special cases",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/cal-param/","calo_adc2mip_special3.dat",1345420801,4294967295,110,"Calorimeter ADC to MIP from flight, special cases",NULL);
 insert into GL_PARAM values(0,"$PAM_CALIB/cal-param/","FCaloAlign.dat",1,1,102,"Calorimeter alignement",NULL);
 insert into GL_PARAM values(0,"$PAM_CALIB/cal-param/","FCaloAlign-flight.dat",1,1,102,"Calorimeter alignement with flight data",NULL);
 insert into GL_PARAM values(0,"$PAM_CALIB/cal-param/","FCaloAlign-flightEMS.dat",1,1,102,"Calorimeter alignement with flight data EM showers",NULL);
 insert into GL_PARAM values(0,"$PAM_CALIB/cal-param/","FCaloAlign-flightINCp.dat",2,4294967295,102,"Calorimeter alignement with flight data, protons, Z alignment changed",NULL);
 insert into GL_PARAM values(0,"$PAM_CALIB/cal-param/","FCaloBadMask.dat",1,1,103,"Calorimeter bad strip offline mask",NULL);
 insert into GL_PARAM values(0,"$PAM_CALIB/cal-param/","FCaloBadMask18Xgood.dat",2,4294967295,103,"Calorimeter bad strip offline mask",NULL);
-insert into GL_PARAM values(0,"$PAM_CALIB/cal-param/","FCaloDefaultCalib.root",0,0,104,"Calorimeter default calibration",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/cal-param/","FCaloDefaultCalib.root",1,1345420800,104,"Calorimeter default calibration",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/cal-param/","FCaloDefaultCalib1.root",1345420801,4294967295,104,"Calorimeter default calibration",NULL);
 insert into GL_PARAM values(0,"$PAM_CALIB/cal-param/","FCaloBadPulsePre0.dat",1,1169000000,105," <0701 Calorimeter bad pre-amplifiers when pulsing offline mask",NULL);
 insert into GL_PARAM values(0,"$PAM_CALIB/cal-param/","FCaloBadPulsePre1.dat",1169000001,4294967295,105," >0701 Calorimeter bad pre-amplifiers when pulsing offline mask",NULL);
-insert into GL_PARAM values(0,"$PAM_CALIB/cal-param/","calo_crosstalk_param_pre_neighbour.dat",1,4294967295,106," Calorimeter pre-amply neighbour correction table",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/cal-param/","calo_crosstalk_param_pre_neighbour.dat",1,1345420800,106," Calorimeter pre-amply neighbour correction table",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/cal-param/","calo_crosstalk_param_pre_neighbour1.dat",1345420801,4294967295,106," Calorimeter pre-amply neighbour correction table",NULL);
 insert into GL_PARAM values(0,"$PAM_CALIB/cal-param/","calo_crosstalk_param_pre_IIneighbour.dat",1,4294967295,107," Calorimeter pre-amply second neighbour correction table",NULL);
 insert into GL_PARAM values(0,"$PAM_CALIB/cal-param/","calo_crosstalk_param_si0.dat",1,1167619688,108,"Calorimeter cross-talk silicon effect",NULL);
 insert into GL_PARAM values(0,"$PAM_CALIB/cal-param/","calo_crosstalk_param_si1.dat",1167619689,4294967295,108,"Calorimeter cross-talk silicon effect",NULL);
-insert into GL_PARAM values(0,"$PAM_CALIB/cal-param/","calo_maxrms_plane0.dat",1,4294967295,109,"Calorimeter 4*rms threshold for each plane (default 26)",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/cal-param/","calo_maxrms_plane0.dat",1,1345420800,109,"Calorimeter 4*rms threshold for each plane (default 26)",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/cal-param/","calo_maxrms_plane1.dat",1345420801,4294967295,109,"Calorimeter 4*rms threshold for each plane (default 26)",NULL);
 insert into GL_PARAM values(0,"$PAM_CALIB/cal-param/","calo_emin_strip0.dat",1,1167619688,111,"Calorimeter Emin threshold for each strip (default 0.7)",NULL);
-insert into GL_PARAM values(0,"$PAM_CALIB/cal-param/","calo_emin_strip1.dat",1167619689,4294967295,111,"Calorimeter Emin threshold for each strip (default 0.7)",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/cal-param/","calo_emin_strip1.dat",1167619689,1345420800,111,"Calorimeter Emin threshold for each strip (default 0.7)",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/cal-param/","calo_emin_strip2.dat",1345420801,4294967295,111,"Calorimeter Emin threshold for each strip (default 0.7), new values for 18X",NULL);
 insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","tofcalib_1.rz",1,1153660000,201," 0 - 07-23      -                       A       A       standard",NULL);
 insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","tofcalib_2.rz",1153660001,1154375000,201," 07-23 - 07-31   HV_D problems           B       B       july            Parameters_jul24-31.txt",NULL);
 insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","tofcalib_3.rz",1154375001,1155850000,201," 07-31 - 08-17   -                       C       C       standard",NULL);
@@ -703,7 +708,18 @@
 insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","tofcalib_50.rz",1254355201,1257033600,201," 09-10-01 09-10-31         good",NULL);
 insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","tofcalib_51.rz",1257033601,1259625600,201," 09-11-01 09-11-30         good",NULL);
 insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","tofcalib_52.rz",1259625601,1262304000,201," 09-12-01 09-12-31         good",NULL);
-insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","tofcalib_53.rz",1262304001,4294967295,201," >10-01-01        good",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","tofcalib_53.rz",1262304001,1264464000,201," 10-01-01 10-01-26         good",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","tofcalib_54.rz",1264464001,1277935200,201," 10-01-26 10-06-30         good",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","tofcalib_55.rz",1277935201,1293836400,201," 10-06-30 10-12-31         good",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","tofcalib_56.rz",1293836401,1304200800,201," 11-01-01 11-04-30         good",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","tofcalib_57.rz",1304200801,1314828000,201," 11-05-01 11-08-31         good",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","tofcalib_58.rz",1314828001,1320700000,201," 11-09-01 11-11-07         good",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","tofcalib_59.rz",1320700001,1322020000,201," 11-11-07 11-11-23 HV_D problems",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","tofcalib_60.rz",1322020001,1325372400,201," 11-11-23 11-12-31         good",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","tofcalib_61.rz",1325372401,1335823200,201," 12-01-01 12-04-30         good",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","tofcalib_62.rz",1335823201,1346450400,201," 12-05-01 12-08-31         good",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","tofcalib_63.rz",1346450401,1356994800,201," 12-08-31 12-12-31         good",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","tofcalib_64.rz",1356994801,4294967295,201," >13-01-01                 good",NULL);
 insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","ToFCalibParam.txt",1,4294967295,202," GP ToF parameters ",NULL);
 insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","adcmonitor.100k.cut.dat",1,1,203," ToF dE/dx II order correction parameters ",NULL);
 insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","dedxmonitor.C.5d.8th.all.dat",1,1,203," ToF dE/dx II order correction parameters ",NULL);
