--- chewbacca/YodaProfiler/docs/PAMELAProductionDB.sql	2010/03/25 16:49:45	1.31
+++ chewbacca/YodaProfiler/docs/PAMELAProductionDB.sql	2010/08/11 07:34:35	1.32
@@ -94,6 +94,12 @@
 INSERT INTO GL_RESURS_OFFSET VALUES(0,'0','19526_072_001_cln1.pam','2009-09-09 21:00:00',NULL);
 INSERT INTO GL_RESURS_OFFSET VALUES(0,'0','19539_073_001_cln1.pam','2009-09-09 21:00:00',NULL);
 INSERT INTO GL_RESURS_OFFSET VALUES(0,'19525','','2009-12-08 21:00:00',NULL);
+INSERT INTO GL_RESURS_OFFSET VALUES(0,'0','20829_072_001_cln1.pam','2009-12-08 21:00:00',NULL);
+INSERT INTO GL_RESURS_OFFSET VALUES(0,'0','20829_073_001_cln1.pam','2009-12-08 21:00:00',NULL);
+INSERT INTO GL_RESURS_OFFSET VALUES(0,'0','20829_074_001_cln1.pam','2009-12-08 21:00:00',NULL);
+INSERT INTO GL_RESURS_OFFSET VALUES(0,'0','20829_075_001_cln1.pam','2009-12-08 21:00:00',NULL);
+INSERT INTO GL_RESURS_OFFSET VALUES(0,'0','20829_075_002_cln1.pam','2009-12-08 21:00:00',NULL);
+INSERT INTO GL_RESURS_OFFSET VALUES(0,'20820','','2010-03-03 21:00:00',NULL);
 
 
 
@@ -500,7 +506,29 @@
 insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","dedxmonitor.C.5d.8th.all.dat",1,1,203," ToF dE/dx II order correction parameters ",NULL);
 insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","dedxmonitor.He.8th.all.dat",1,1,203," ToF dE/dx II order correction parameters based on He",NULL);
 insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","dedxmonitor.He.9th.all.dat",1,4294967295,203," ToF dE/dx II order correction parameters based on He 9th data reduction",NULL);
-insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","attenuation.txt",1,4294967295,204," ToF attenuation parameter file ",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","atten_period_1.dat",1,1150848001,204," ToF attenuation parameter file period 1 ",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","atten_period_2.dat",1150848000,1154995201,204," ToF attenuation parameter file period 2 ",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","atten_period_3.dat",1154995200,1158019201,204," ToF attenuation parameter file period 3 ",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","atten_period_4.dat",1158019200,1161216001,204," ToF attenuation parameter file period 4 ",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","atten_period_5.dat",1161216000,1164499201,204," ToF attenuation parameter file period 5 ",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","atten_period_6.dat",1164499200,1167955201,204," ToF attenuation parameter file period 6 ",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","atten_period_7.dat",1167955200,1171670401,204," ToF attenuation parameter file period 7 ",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","atten_period_8.dat",1171670400,1175472001,204," ToF attenuation parameter file period 8 ",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","atten_period_9.dat",1175472000,1179446401,204," ToF attenuation parameter file period 9 ",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","atten_period_10.dat",1179446400,1184284801,204," ToF attenuation parameter file period 10 ",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","atten_period_11.dat",1184284800,1188691201,204," ToF attenuation parameter file period 11 ",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","atten_period_12.dat",1188691200,1193356801,204," ToF attenuation parameter file period 12 ",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","atten_period_13.dat",1193356800,1198195201,204," ToF attenuation parameter file period 13 ",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","atten_period_14.dat",1198195200,1203292801,204," ToF attenuation parameter file period 14 ",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","atten_period_15.dat",1203292800,1208822401,204," ToF attenuation parameter file period 15 ",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","atten_period_16.dat",1208822400,1214524801,204," ToF attenuation parameter file period 16 ",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","atten_period_17.dat",1214524800,1220659201,204," ToF attenuation parameter file period 17 ",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","atten_period_18.dat",1220659200,1228953601,204," ToF attenuation parameter file period 18 ",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","atten_period_19.dat",1228953600,1237593601,204," ToF attenuation parameter file period 19 ",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","atten_period_20.dat",1237593600,1244592001,204," ToF attenuation parameter file period 20 ",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","atten_period_21.dat",1244592000,1252108801,204," ToF attenuation parameter file period 21 ",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","atten_period_22.dat",1252108800,4294967295,204," ToF attenuation parameter file period 22 ",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","attenuation.txt",1,1,204," ToF attenuation parameter file ",NULL);
 insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","desaturation_position.txt",1,4294967295,205," ToF desaturation on position parameter file ",NULL);
 insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","BetheBloch.txt",1,4294967295,206," ToF BetheBloch parameter file ",NULL);
 insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","BetheBloch_betagt1.txt",1,4294967295,207," ToF Bethe-Bloch parameter file for beta gt1 ",NULL);
