--- chewbacca/YodaProfiler/docs/PAMELAProductionDB.sql	2010/02/17 11:48:33	1.30
+++ chewbacca/YodaProfiler/docs/PAMELAProductionDB.sql	2010/03/25 16:49:45	1.31
@@ -481,11 +481,25 @@
 insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","tofcalib_36.rz",1229470001,1229730000,201," 12-17 - 12-19   HV_E problems (?)       36      36      calper_36",NULL);
 insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","tofcalib_37.rz",1229730001,1230318000,201," 12-19 - 12-26   good                    37      37      calper_37",NULL);
 insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","tofcalib_38.rz",1230318001,1230410000,201," 12-26 - 12-27   HV_H problems           38      38      calper_38",NULL);
-insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","tofcalib_39.rz",1230410001,4294967295,201," > 12-27         good                    39      39      calper_39",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","tofcalib_39.rz",1230410001,1230768000,201," 12-27 - 12-31   good                    39      39      calper_39",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","tofcalib_41.rz",1230768001,1232496000,201," 09-01-01 09-01-20         good",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","tofcalib_42.rz",1232496001,1235347200,201," 09-01-21 09-02-22         good",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","tofcalib_43.rz",1235347201,1238544000,201," 09-02-23 09-03-31         good",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","tofcalib_44.rz",1238544001,1241136000,201," 09-04-01 09-04-30         good",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","tofcalib_45.rz",1241136001,1243814400,201," 09-05-01 09-05-31         good",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","tofcalib_46.rz",1243814401,1246406400,201," 09-06-01 09-06-30         good",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","tofcalib_47.rz",1246406401,1249084800,201," 09-07-01 09-07-31         good",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","tofcalib_48.rz",1249084801,1251763200,201," 09-08-01 09-08-31         good",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","tofcalib_49.rz",1251763201,1254355200,201," 09-09-01 09-09-30         good",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","tofcalib_50.rz",1254355201,1257033600,201," 09-10-01 09-10-31         good",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","tofcalib_51.rz",1257033601,1259625600,201," 09-11-01 09-11-30         good",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","tofcalib_52.rz",1259625601,1262304000,201," 09-12-01 09-12-31         good",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","tofcalib_53.rz",1262304001,4294967295,201," >10-01-01        good",NULL);
 insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","ToFCalibParam.txt",1,4294967295,202," GP ToF parameters ",NULL);
 insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","adcmonitor.100k.cut.dat",1,1,203," ToF dE/dx II order correction parameters ",NULL);
 insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","dedxmonitor.C.5d.8th.all.dat",1,1,203," ToF dE/dx II order correction parameters ",NULL);
-insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","dedxmonitor.He.8th.all.dat",1,4294967295,203," ToF dE/dx II order correction parameters based on He",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","dedxmonitor.He.8th.all.dat",1,1,203," ToF dE/dx II order correction parameters based on He",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","dedxmonitor.He.9th.all.dat",1,4294967295,203," ToF dE/dx II order correction parameters based on He 9th data reduction",NULL);
 insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","attenuation.txt",1,4294967295,204," ToF attenuation parameter file ",NULL);
 insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","desaturation_position.txt",1,4294967295,205," ToF desaturation on position parameter file ",NULL);
 insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","BetheBloch.txt",1,4294967295,206," ToF BetheBloch parameter file ",NULL);
