--- chewbacca/YodaProfiler/docs/PAMELAProductionDB.sql	2010/01/26 13:29:29	1.27
+++ chewbacca/YodaProfiler/docs/PAMELAProductionDB.sql	2010/01/29 17:15:59	1.28
@@ -483,7 +483,8 @@
 insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","tofcalib_39.rz",1230410001,4294967295,201," > 12-27         good                    39      39      calper_39",NULL);
 insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","ToFCalibParam.txt",1,4294967295,202," GP ToF parameters ",NULL);
 insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","adcmonitor.100k.cut.dat",1,1,203," ToF dE/dx II order correction parameters ",NULL);
-insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","dedxmonitor.C.5d.8th.all.dat",1,4294967295,203," ToF dE/dx II order correction parameters ",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","dedxmonitor.C.5d.8th.all.dat",1,1,203," ToF dE/dx II order correction parameters ",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","dedxmonitor.He.8th.all.dat",1,4294967295,203," ToF dE/dx II order correction parameters based on He",NULL);
 insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","attenuation.txt",1,4294967295,204," ToF attenuation parameter file ",NULL);
 insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","desaturation_position.txt",1,4294967295,205," ToF desaturation on position parameter file ",NULL);
 insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","BetheBloch.txt",1,4294967295,206," ToF BetheBloch parameter file ",NULL);
