--- chewbacca/YodaProfiler/docs/PAMELAProductionDB.sql	2009/11/20 14:30:24	1.19
+++ chewbacca/YodaProfiler/docs/PAMELAProductionDB.sql	2009/12/10 13:18:08	1.20
@@ -421,7 +421,8 @@
 insert into GL_PARAM values(0,"$PAM_CALIB/cal-param/","FCaloADC2MIP.dat",1,1,101,"Calorimeter ADC to MIP from ground data",NULL);
 insert into GL_PARAM values(0,"$PAM_CALIB/cal-param/","FCaloADC2MIPfc.dat",2,4294967295,101,"Calorimeter ADC to MIP from flight, relativistic particles",NULL);
 insert into GL_PARAM values(0,"$PAM_CALIB/cal-param/","calo_adc2mip_special0.dat",1,1172976488,110,"Calorimeter ADC to MIP from flight, special cases",NULL);
-insert into GL_PARAM values(0,"$PAM_CALIB/cal-param/","calo_adc2mip_special1.dat",1172976488,4294967295,110,"Calorimeter ADC to MIP from flight, special cases",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/cal-param/","calo_adc2mip_special1.dat",1172976488,1190000000,110,"Calorimeter ADC to MIP from flight, special cases",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/cal-param/","calo_adc2mip_special2.dat",1190000000,4294967295,110,"Calorimeter ADC to MIP from flight, special cases",NULL);
 insert into GL_PARAM values(0,"$PAM_CALIB/cal-param/","FCaloAlign.dat",1,1,102,"Calorimeter alignement",NULL);
 insert into GL_PARAM values(0,"$PAM_CALIB/cal-param/","FCaloAlign-flight.dat",1,1,102,"Calorimeter alignement with flight data",NULL);
 insert into GL_PARAM values(0,"$PAM_CALIB/cal-param/","FCaloAlign-flightEMS.dat",1,1,102,"Calorimeter alignement with flight data EM showers",NULL);
