--- chewbacca/YodaProfiler/docs/PAMELAProductionDB.sql	2009/09/14 14:06:54	1.18
+++ chewbacca/YodaProfiler/docs/PAMELAProductionDB.sql	2009/11/20 14:30:24	1.19
@@ -478,7 +478,33 @@
 insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","tofcalib_38.rz",1230318001,1230410000,201," 12-26 - 12-27   HV_H problems           38      38      calper_38",NULL);
 insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","tofcalib_39.rz",1230410001,4294967295,201," > 12-27         good                    39      39      calper_39",NULL);
 insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","ToFCalibParam.txt",1,4294967295,202," GP ToF parameters ",NULL);
-insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","adcmonitor.100k.cut.dat",1,4294967295,203," ToF dE/dx II order correction parameters ",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","adcmonitor.100k.cut.dat",1,1,203," ToF dE/dx II order correction parameters ",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","dedxmonitor.C.5d.8th.all.dat",1,4294967295,203," ToF dE/dx II order correction parameters ",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","attenuation.txt",1,4294967295,204," ToF attenuation parameter file ",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","desaturation_position.txt",1,4294967295,205," ToF desaturation on position parameter file ",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","BetheBloch.txt",1,4294967295,206," ToF BetheBloch parameter file ",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","BetheBloch_betagt1.txt",1,4294967295,207," ToF Bethe-Bloch parameter file for beta gt1 ",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","desaturation_beta.txt",1,4294967295,208," ToF desaturation on beta parameter file ",NULL);
+insert into GL_PARAM values(0,"","",1182100001,1183030000,210," A connector ",NULL);
+insert into GL_PARAM values(0,"","",1174665001,1175000000,211," B connector ",NULL);
+insert into GL_PARAM values(0,"","",1206100001,1206375600,212," C connector ",NULL);
+insert into GL_PARAM values(0,"","",1153660001,1154375000,213," D connector ",NULL);
+insert into GL_PARAM values(0,"","",1168490001,1168940000,213," D connector ",NULL);
+insert into GL_PARAM values(0,"","",1185090001,1185212000,213," D connector ",NULL);
+insert into GL_PARAM values(0,"","",1191100001,1191940000,213," D connector ",NULL);
+insert into GL_PARAM values(0,"","",1176800001,1178330000,214," E connector ",NULL);
+insert into GL_PARAM values(0,"","",1217989201,1218547800,214," E connector ",NULL);
+insert into GL_PARAM values(0,"","",1225789201,1226566800,214," E connector ",NULL);
+insert into GL_PARAM values(0,"","",1229400901,1229700000,214," E connector ",NULL);
+insert into GL_PARAM values(0,"","",1230318001,1230415200,214," E connector ",NULL);
+insert into GL_PARAM values(0,"","",1168940001,1169580000,215," F connector ",NULL);
+insert into GL_PARAM values(0,"","",1155850001,1156280000,217," H connector ",NULL);
+insert into GL_PARAM values(0,"","",1176120001,1176800000,217," H connector ",NULL);
+insert into GL_PARAM values(0,"","",1178330001,1181322000,217," H connector ",NULL);
+insert into GL_PARAM values(0,"","",1184000001,1184570000,217," H connector ",NULL);
+insert into GL_PARAM values(0,"","",1196230001,1196280000,217," H connector ",NULL);
+insert into GL_PARAM values(0,"","",1168940001,1169580000,220," M connector ",NULL);
+insert into GL_PARAM values(0,"","",1155850001,1156280000,221," N connector ",NULL);
 insert into GL_PARAM values(0,"$PAM_CALIB/orb-param/","igrf05.dat",0,0,301,"igrf 2005",NULL);
 insert into GL_PARAM values(0,"$PAM_CALIB/orb-param/","igrf05s.dat",0,0,302,"igrf 2010",NULL);
 
