--- chewbacca/YodaProfiler/docs/PAMELAProductionDB.sql	2008/12/30 14:21:19	1.14
+++ chewbacca/YodaProfiler/docs/PAMELAProductionDB.sql	2009/03/19 11:01:33	1.16
@@ -72,6 +72,13 @@
 INSERT INTO GL_RESURS_OFFSET VALUES(0,'0','14033_201_001_cln1.pam','2008-12-15 21:00:00',NULL);
 INSERT INTO GL_RESURS_OFFSET VALUES(0,'0','14034_001_001_cln1.pam','2008-12-15 21:00:00',NULL);
 INSERT INTO GL_RESURS_OFFSET VALUES(0,'14044','','2008-12-15 21:00:00',NULL);
+INSERT INTO GL_RESURS_OFFSET VALUES(0,'0','15441_002_001_cln1.pam','2008-12-15 21:00:00',NULL);
+INSERT INTO GL_RESURS_OFFSET VALUES(0,'0','15441_003_001_cln1.pam','2008-12-15 21:00:00',NULL);
+INSERT INTO GL_RESURS_OFFSET VALUES(0,'0','15442_002_001_cln1.pam','2008-12-15 21:00:00',NULL);
+INSERT INTO GL_RESURS_OFFSET VALUES(0,'0','15442_003_001_cln1.pam','2008-12-15 21:00:00',NULL);
+INSERT INTO GL_RESURS_OFFSET VALUES(0,'0','15442_504_001_cln1.pam','2008-12-15 21:00:00',NULL);
+INSERT INTO GL_RESURS_OFFSET VALUES(0,'0','15445_002_001_cln1.pam','2008-12-15 21:00:00',NULL);
+INSERT INTO GL_RESURS_OFFSET VALUES(0,'15430','','2009-03-16 21:00:00',NULL);
 
 
 CREATE TABLE `GL_TIMESYNC` (
@@ -445,9 +452,19 @@
 insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","tofcalib_26.rz",1195200001,1196230000,201," 11-16 - 11-28   Timing changes         26      26      standard",NULL);
 insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","tofcalib_27.rz",1196230001,1196280000,201," 11-28 - 11-28   HV_D problems          27      27      standard",NULL);
 insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","tofcalib_28.rz",1196280001,1206100000,201," 11-29 - 03-21                          28      28      standard",NULL);
-insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","tofcalib_29.rz",1206100001,4294967295,201," > 03-21         HV_C problems          29      29      standard",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","tofcalib_29.rz",1206100001,1206375600,201," 03-21 - 03-24   HV_C problems          29      29 ",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","tofcalib_30.rz",1206375601,1217989200,201," 03-24 - 08-06   good                    30      30      calper_30 ",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","tofcalib_31.rz",1217989201,1218550000,201," 08-06 - 08-12   HV_E problems ?         31      31      calper_31",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","tofcalib_32.rz",1218550001,1225789200,201," 08-12 - 11-04   good                    32      32      calper_32",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","tofcalib_33.rz",1225789201,1226566800,201," 11-04 - 11-13   HV_E problems ?         33      33      calper_33 ",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","tofcalib_34.rz",1226566801,1229400000,201," 11-13 - 12-16   good                    34      34      calper_34",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","tofcalib_35.rz",1229400001,1229470000,201," 12-16 - 12-17   HV_F probl. + HV_E (?)  35      35      calper_35",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","tofcalib_36.rz",1229470001,1229730000,201," 12-17 - 12-19   HV_E problems (?)       36      36      calper_36",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","tofcalib_37.rz",1229730001,1230318000,201," 12-19 - 12-26   good                    37      37      calper_37",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","tofcalib_38.rz",1230318001,1230410000,201," 12-26 - 12-27   HV_H problems           38      38      calper_38",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","tofcalib_39.rz",1230410001,4294967295,201," > 12-27         good                    39      39      calper_39",NULL);
 insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","ToFCalibParam.txt",1,4294967295,202," GP ToF parameters ",NULL);
-insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","adcmonitor.7th.100k.cut.dat",1,4294967295,203," ToF dE/dx II order correction parameters ",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","adcmonitor.100k.cut.dat",1,4294967295,203," ToF dE/dx II order correction parameters ",NULL);
 insert into GL_PARAM values(0,"$PAM_CALIB/orb-param/","igrf05.dat",0,0,301,"igrf 2005",NULL);
 insert into GL_PARAM values(0,"$PAM_CALIB/orb-param/","igrf05s.dat",0,0,302,"igrf 2010",NULL);
 
