--- chewbacca/YodaProfiler/docs/PAMELAProductionDB.sql	2008/12/18 12:58:38	1.11
+++ chewbacca/YodaProfiler/docs/PAMELAProductionDB.sql	2008/12/18 14:47:08	1.12
@@ -706,6 +706,7 @@
   `BAD_PKT_CALREAD` int  default '0' COMMENT 'The number of Calibration packet that could have problems.',
   `NUM_PKT_SAVED` int  default '0' COMMENT 'The total number of packet saved in the ROOT file',
   `INPUT_NAME` varchar(255) default './nnnnmmm.pam' COMMENT 'It is the filename of the input file',  
+  `TIME_IS_ESTIMATED` tinyint(1) unsigned NOT NULL default '0' COMMENT 'No timesync was found for this entry, we use a timesync from the same download',
   `INSERT_TIME` timestamp default CURRENT_TIMESTAMP, 
  PRIMARY KEY  (`ID_N`)
 ) 
@@ -731,6 +732,7 @@
   `BAD_PKT_CALREAD` int  default '0' COMMENT 'The number of Calibration packet that could have problems.',
   `NUM_PKT_SAVED` int  default '0' COMMENT 'The number of packet saved in the ROOT file',
   `INPUT_NAME` varchar(255) default './nnnnmmm.pam' COMMENT 'It is the filename of the input file',  
+  `TIME_IS_ESTIMATED` tinyint(1) unsigned NOT NULL default '0' COMMENT 'No timesync was found for this entry, we use a timesync from the same download',
   `INSERT_TIME` timestamp default CURRENT_TIMESTAMP, 
   PRIMARY KEY  (`ID_N`)
 ) 
