--- chewbacca/YodaProfiler/docs/GP_PARAM.sql	2011/02/28 14:20:59	1.10
+++ chewbacca/YodaProfiler/docs/GP_PARAM.sql	2014/02/24 13:50:39	1.11
@@ -27,7 +27,7 @@
 
 
 DELETE FROM GL_PARAM where TYPE=201;
-insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","tofcalib_gp.rz",0,0,201,"GPAMELA default calibration",NULL);
+insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","tofcalib_3par_gp.rz",0,0,201,"GPAMELA default calibration",NULL);
 delete from GL_PARAM where TYPE>=210 and TYPE<=221;
 DELETE FROM GL_PARAM where TYPE=203;
 insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","dedxmonitor.He.simu.dat",1,4294967295,203," ToF dE/dx II order correction parameters - simulation",NULL);
