--- chewbacca/YodaProfiler/docs/GP_PARAM.sql	2008/09/23 07:20:29	1.1.1.1
+++ chewbacca/YodaProfiler/docs/GP_PARAM.sql	2008/11/04 15:02:00	1.2
@@ -2,17 +2,19 @@
 
 SET time_zone='+0:00';
 
-DELETE FROM GL_PARAM where TYPE<100;
+DELETE FROM GL_PARAM where TYPE=4;
+insert into GL_PARAM values(0,"$PAM_CALIB/trk-param/","eta_param_GP-1/",0,0,4,"trk pfa",NULL);
 
-insert into GL_PARAM values(0,"$PAM_CALIB/trk-param/","field_param-0/",0,0,1,"field",NULL);
-insert into GL_PARAM values(0,"$PAM_CALIB/trk-param/","mip_param-0/",0,0,2,"trk mip",NULL);
-insert into GL_PARAM values(0,"$PAM_CALIB/trk-param/","charge_param-1/",0,0,3,"trk charge",NULL);
-insert into GL_PARAM values(0,"$PAM_CALIB/trk-param/","eta_param_GP-0/",0,0,4,"trk pfa",NULL);
-insert into GL_PARAM values(0,"$PAM_CALIB/trk-param/","align_param_GP-0/",0,0,5,"trk alignment",NULL);
+DELETE FROM GL_PARAM where TYPE=5;
+insert into GL_PARAM values(0,"$PAM_CALIB/trk-param/","align_param_GP-1/",0,0,5,"trk alignment",NULL);
+
+DELETE FROM GL_PARAM where TYPE=6;
 insert into GL_PARAM values(0,"$PAM_CALIB/trk-param/","mask_param-1/",0,0,6,"trk mask",NULL);
-insert into GL_PARAM values(0,"$PAM_CALIB/trk-param/","default_calib/",0,0,7,"default calibration",NULL);
 
-DELETE FROM GL_PARAM where TYPE=201;
+DELETE FROM GL_PARAM where TYPE=8;
+insert into GL_PARAM values(0,"$PAM_CALIB/trk-param/","calib_GP/",0,0,8,"GP trk calibration",NULL);
 
+
+DELETE FROM GL_PARAM where TYPE=201;
 insert into GL_PARAM values(0,"$PAM_CALIB/tof-param/","tofcalib_gp.rz",0,0,201,"GPAMELA default calibration",NULL);
 
