File: dw_041126_00402.Physics.Calorimeter.Event.root

Baseline

Entries 3.410458e+07 Mean 4605 RMS 6158

ADC channels

0 5000 1000015000200002500030000350004000045000

Number of events

0 2 4 6 8 10 12 14 16 610 × baselines Dexyc

Entries 3.410458e+07 Mean 16.75 RMS 239.2

ADC channels

0 20004000600080001000012000140001600018000200002200024000

Number of events

1 10 210 310 410 510 610 710

Dexyc

dexyc

Calstriphit Entries 14144 Mean 12.28 RMS 12.18

Number of hit

0 10 20 30 40 50 60

Number of events

0

1000

2000

3000

4000

5000

6000 calstriphit[1:4] Dexy_{Entries 5.356454e+07}

Mean 4568 RMS 6104

ADC channels

0 5000 1000015000200002500030000350004000045000

Number of events

0 2 4 6 8 10 12 14 16 610 × Dexy

Entries 5.356454e+07

dexy