File: dw_041126_00402.Physics.Calorimeter.Event.root

Number of hit (dexyc>0)

0 10 20 30 40 50 60

Number of events

0

100

200

300

400

500 h1 Entries 8074 Mean 21.45 RMS 7.752

Strips hit, compress mode

Number of hit (dexy>0)

-2000 -1000 0 1000 2000 3000 4000 5000 6000

Number of events

1

10

210

310

410 h1r Entries 12681 Mean 4035 RMS 29.51

Strips hit, raw mode

iev 0 2000 4000 6000 800010000120001400016000 calevnum 2

0

1000

2000

3000

4000

5000

6000

7000

8000 calev2

Entries 14144

Mean x 7072

Mean y 1028

RMS x 4083

RMS y 2052 calevnum(2)%iev