Thu Dec 2 17:35:04 2004

MIP

strip

0 10 20 30 40 50 60 70 80 90

X - plane

0

5

10

15

20 strip

0 10 20 30 40 50 60 70 80 90

Y - plane

0

5

10

15

20

0

0-2

2-10

10-100

100-1000

>1000

Calorimeter tracks - file dw_040709_003.Physics.Calorimeter.Event.root - event number 152

QTOT = 81 NSTRIP = 45 Bad strips = 8