Thu Dec 2 11:42:06 2004

ADC ch.

strip

0 10 20 30 40 50 60 70 80 90

X - plane

0

5

10

15

20 strip

0 10 20 30 40 50 60 70 80 90

Y - plane

0

5

10

15

20

OFF

0-1.5

1.5-3

3-4.5

4.5-10

>10

BAD

Calorimeter: strip RMS - file dw_041126_00402.Physics.Calorimeter.Event.root - calibration number 1