0 10 20 30 40 50

fmip 0 0 22 Entries 8426 Mean 20.47 RMS 11.54 / ndf

2χ 54.52 / 32 Width 0.107± 2.305 MP 0.16± 22.75 Area 101.8± 5534 GSigma 0.331± 2.933

10

210

310