SET time_zone='+0:00';
insert into GL_PARAM values(0,"fullpathgoesere/trk-param/","field_param-0/",0,0,1,"field",NULL);
insert into GL_PARAM values(0,"fullpathgoesere/trk-param/","mip_param-0/",0,0,2,"trk mip",NULL);
insert into GL_PARAM values(0,"fullpathgoesere/trk-param/","charge_param-1/",0,0,3,"trk charge",NULL);
insert into GL_PARAM values(0,"fullpathgoesere/trk-param/","eta_param-0/",0,0,4,"trk pfa",NULL);
insert into GL_PARAM values(0,"fullpathgoesere/trk-param/","align_param-0/",0,0,5,"trk alignment",NULL);
insert into GL_PARAM values(0,"fullpathgoesere/trk-param/","mask_param-0/",0,0,6,"trk mask",NULL);
insert into GL_PARAM values(0,"fullpathgoesere/trk-param/","default_calib/",0,0,7,"default calibration",NULL);
insert into GL_PARAM values(0,"fullpathgoesere/cal-param/","FCaloADC2MIP.dat",0,0,101,"Calorimeter ADC to MIP",NULL);
insert into GL_PARAM values(0,"fullpathgoesere/cal-param/","FCaloAlign.dat",0,0,102,"Calorimeter alignement",NULL);
insert into GL_PARAM values(0,"fullpathgoesere/cal-param/","FCaloBadMask.dat",0,0,103,"Calorimeter bad strip offline mask",NULL);
insert into GL_PARAM values(0,"fullpathgoesere/cal-param/","FCaloDefaultCalib.root",0,0,104,"Calorimeter default calibration",NULL);
insert into GL_PARAM values(0,"fullpathgoesere/tof-param/","tofcalib.rz",0,0,201,"tof param",NULL);
