--- DarthVader/docs/install_GL_PARAM.sql	2006/11/24 08:31:31	1.5
+++ DarthVader/docs/install_GL_PARAM.sql	2007/01/11 14:33:51	1.7
@@ -6,7 +6,8 @@
 insert into GL_PARAM values(0,"fullpathgoesere/trk-param/","align_param-0/",0,0,5,"trk alignment",NULL);
 insert into GL_PARAM values(0,"fullpathgoesere/trk-param/","mask_param-1/",0,0,6,"trk mask",NULL);
 insert into GL_PARAM values(0,"fullpathgoesere/trk-param/","default_calib/",0,0,7,"default calibration",NULL);
-insert into GL_PARAM values(0,"fullpathgoesere/cal-param/","FCaloADC2MIP.dat",0,0,101,"Calorimeter ADC to MIP",NULL);
+insert into GL_PARAM values(0,"fullpathgoesere/cal-param/","FCaloADC2MIP.dat",1,1,101,"Calorimeter ADC to MIP from ground data",NULL);
+insert into GL_PARAM values(0,"fullpathgoesere/cal-param/","FCaloADC2MIP-dws2000.dat",2,4294967295,101,"Calorimeter ADC to MIP from flight data dw serie 2000",NULL);
 insert into GL_PARAM values(0,"fullpathgoesere/cal-param/","FCaloAlign.dat",0,0,102,"Calorimeter alignement",NULL);
 insert into GL_PARAM values(0,"fullpathgoesere/cal-param/","FCaloBadMask.dat",0,0,103,"Calorimeter bad strip offline mask",NULL);
 insert into GL_PARAM values(0,"fullpathgoesere/cal-param/","FCaloDefaultCalib.root",0,0,104,"Calorimeter default calibration",NULL);
