--- DarthVader/docs/install_GL_PARAM.sql	2006/11/09 17:05:51	1.3
+++ DarthVader/docs/install_GL_PARAM.sql	2006/11/14 14:08:51	1.4
@@ -8,4 +8,6 @@
 insert into GL_PARAM values(0,"fullpathgoesere/trk-param/","default_calib/",0,0,7,"default calibration",NULL);
 insert into GL_PARAM values(0,"fullpathgoesere/cal-param/","FCaloADC2MIP.dat",0,0,101,"Calorimeter ADC to MIP",NULL);
 insert into GL_PARAM values(0,"fullpathgoesere/cal-param/","FCaloAlign.dat",0,0,102,"Calorimeter alignement",NULL);
+insert into GL_PARAM values(0,"fullpathgoesere/cal-param/","FCaloBadMask.dat",0,0,103,"Calorimeter bad strip offline mask",NULL);
+insert into GL_PARAM values(0,"fullpathgoesere/cal-param/","FCaloDefaultCalib.root",0,0,104,"Calorimeter default calibration",NULL);
 insert into GL_PARAM values(0,"fullpathgoesere/tof-param/","tofcalib.rz",0,0,201,"tof param",NULL);
