--- DarthVader/docs/install_GL_PARAM.sql	2006/11/09 17:05:51	1.3
+++ DarthVader/docs/install_GL_PARAM.sql	2007/04/02 14:51:03	1.11
@@ -4,8 +4,16 @@
 insert into GL_PARAM values(0,"fullpathgoesere/trk-param/","charge_param-1/",0,0,3,"trk charge",NULL);
 insert into GL_PARAM values(0,"fullpathgoesere/trk-param/","eta_param-0/",0,0,4,"trk pfa",NULL);
 insert into GL_PARAM values(0,"fullpathgoesere/trk-param/","align_param-0/",0,0,5,"trk alignment",NULL);
-insert into GL_PARAM values(0,"fullpathgoesere/trk-param/","mask_param-0/",0,0,6,"trk mask",NULL);
+insert into GL_PARAM values(0,"fullpathgoesere/trk-param/","mask_param-1/",0,0,6,"trk mask",NULL);
 insert into GL_PARAM values(0,"fullpathgoesere/trk-param/","default_calib/",0,0,7,"default calibration",NULL);
-insert into GL_PARAM values(0,"fullpathgoesere/cal-param/","FCaloADC2MIP.dat",0,0,101,"Calorimeter ADC to MIP",NULL);
-insert into GL_PARAM values(0,"fullpathgoesere/cal-param/","FCaloAlign.dat",0,0,102,"Calorimeter alignement",NULL);
-insert into GL_PARAM values(0,"fullpathgoesere/tof-param/","tofcalib.rz",0,0,201,"tof param",NULL);
+insert into GL_PARAM values(0,"fullpathgoesere/cal-param/","FCaloADC2MIP-dws2000.dat",1,1,101,"Calorimeter ADC to MIP from flight data dw serie 2000",NULL);
+insert into GL_PARAM values(0,"fullpathgoesere/cal-param/","FCaloADC2MIP.dat",2,4294967295,101,"Calorimeter ADC to MIP from ground data",NULL);
+insert into GL_PARAM values(0,"fullpathgoesere/cal-param/","FCaloAlign.dat",1,1,102,"Calorimeter alignement",NULL);
+insert into GL_PARAM values(0,"fullpathgoesere/cal-param/","FCaloAlign-flight.dat",2,4294967295,102,"Calorimeter alignement",NULL);
+insert into GL_PARAM values(0,"fullpathgoesere/cal-param/","FCaloBadMask.dat",0,0,103,"Calorimeter bad strip offline mask",NULL);
+insert into GL_PARAM values(0,"fullpathgoesere/cal-param/","FCaloDefaultCalib.root",0,0,104,"Calorimeter default calibration",NULL);
+insert into GL_PARAM values(0,"fullpathgoesere/tof-param/","tofcalib.rz",1,1153699999,201,"tof param from flight data",NULL);
+insert into GL_PARAM values(0,"fullpathgoesere/tof-param/","tofcalib_001.rz",1153700000,1154400000,201,"tof param from flight data 24th-28th July 2006",NULL);
+insert into GL_PARAM values(0,"fullpathgoesere/tof-param/","tofcalib.rz",1154400001,4294967295,201,"tof param from flight data",NULL);
+insert into GL_PARAM values(0,"fullpathgoesere/orb-param/","igrf05.dat",0,0,301,"igrf 2005",NULL);
+insert into GL_PARAM values(0,"fullpathgoesere/orb-param/","igrf05s.dat",0,0,302,"igrf 2010",NULL);
