--- DarthVader/docs/install_GL_PARAM.sql	2007/01/23 11:52:37	1.9
+++ DarthVader/docs/install_GL_PARAM.sql	2007/03/26 14:02:09	1.10
@@ -8,7 +8,8 @@
 insert into GL_PARAM values(0,"fullpathgoesere/trk-param/","default_calib/",0,0,7,"default calibration",NULL);
 insert into GL_PARAM values(0,"fullpathgoesere/cal-param/","FCaloADC2MIP.dat",1,1,101,"Calorimeter ADC to MIP from ground data",NULL);
 insert into GL_PARAM values(0,"fullpathgoesere/cal-param/","FCaloADC2MIP-dws2000.dat",2,4294967295,101,"Calorimeter ADC to MIP from flight data dw serie 2000",NULL);
-insert into GL_PARAM values(0,"fullpathgoesere/cal-param/","FCaloAlign.dat",0,0,102,"Calorimeter alignement",NULL);
+insert into GL_PARAM values(0,"fullpathgoesere/cal-param/","FCaloAlign.dat",1,1,102,"Calorimeter alignement",NULL);
+insert into GL_PARAM values(0,"fullpathgoesere/cal-param/","FCaloAlign-flight.dat",2,4294967295,102,"Calorimeter alignement",NULL);
 insert into GL_PARAM values(0,"fullpathgoesere/cal-param/","FCaloBadMask.dat",0,0,103,"Calorimeter bad strip offline mask",NULL);
 insert into GL_PARAM values(0,"fullpathgoesere/cal-param/","FCaloDefaultCalib.root",0,0,104,"Calorimeter default calibration",NULL);
 insert into GL_PARAM values(0,"fullpathgoesere/tof-param/","tofcalib.rz",1,1153699999,201,"tof param from flight data",NULL);
